\hypertarget{structe1000__phy__stats}{}\doxysection{e1000\+\_\+phy\+\_\+stats Struct Reference}
\label{structe1000__phy__stats}\index{e1000\_phy\_stats@{e1000\_phy\_stats}}


{\ttfamily \#include $<$e1000\+\_\+hw.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{e1000__osdep_8h_afaa62991928fb9fb18ff0db62a040aba}{u32}} \mbox{\hyperlink{structe1000__phy__stats_a891662dbd68c719cbd113431ec2fc659}{idle\+\_\+errors}}
\item 
\mbox{\hyperlink{e1000__osdep_8h_afaa62991928fb9fb18ff0db62a040aba}{u32}} \mbox{\hyperlink{structe1000__phy__stats_ac2ee0e298836e4bfa06653c44f0823b7}{receive\+\_\+errors}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{e1000__hw_8h_source_l00671}{671}} of file \mbox{\hyperlink{e1000__hw_8h_source}{e1000\+\_\+hw.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structe1000__phy__stats_a891662dbd68c719cbd113431ec2fc659}\label{structe1000__phy__stats_a891662dbd68c719cbd113431ec2fc659}} 
\index{e1000\_phy\_stats@{e1000\_phy\_stats}!idle\_errors@{idle\_errors}}
\index{idle\_errors@{idle\_errors}!e1000\_phy\_stats@{e1000\_phy\_stats}}
\doxysubsubsection{\texorpdfstring{idle\_errors}{idle\_errors}}
{\footnotesize\ttfamily \mbox{\hyperlink{e1000__osdep_8h_afaa62991928fb9fb18ff0db62a040aba}{u32}} e1000\+\_\+phy\+\_\+stats\+::idle\+\_\+errors}



Definition at line \mbox{\hyperlink{e1000__hw_8h_source_l00672}{672}} of file \mbox{\hyperlink{e1000__hw_8h_source}{e1000\+\_\+hw.\+h}}.

\mbox{\Hypertarget{structe1000__phy__stats_ac2ee0e298836e4bfa06653c44f0823b7}\label{structe1000__phy__stats_ac2ee0e298836e4bfa06653c44f0823b7}} 
\index{e1000\_phy\_stats@{e1000\_phy\_stats}!receive\_errors@{receive\_errors}}
\index{receive\_errors@{receive\_errors}!e1000\_phy\_stats@{e1000\_phy\_stats}}
\doxysubsubsection{\texorpdfstring{receive\_errors}{receive\_errors}}
{\footnotesize\ttfamily \mbox{\hyperlink{e1000__osdep_8h_afaa62991928fb9fb18ff0db62a040aba}{u32}} e1000\+\_\+phy\+\_\+stats\+::receive\+\_\+errors}



Definition at line \mbox{\hyperlink{e1000__hw_8h_source_l00673}{673}} of file \mbox{\hyperlink{e1000__hw_8h_source}{e1000\+\_\+hw.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/e1000/\mbox{\hyperlink{e1000__hw_8h}{e1000\+\_\+hw.\+h}}\end{DoxyCompactItemize}
