\hypertarget{structprotoent}{}\doxysection{protoent Struct Reference}
\label{structprotoent}\index{protoent@{protoent}}


Collaboration diagram for protoent\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=268pt]{d6/df2/structprotoent__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{netgraph_8h_ab3a2553a36b03752ec05a6d4ca11d8a3}{hook\+\_\+p}} \mbox{\hyperlink{structprotoent_a7a1bb639692da821273ee5f7d5850ef4}{hook}}
\item 
uint16\+\_\+t \mbox{\hyperlink{structprotoent_a893376ddc0a43c574731d8058e6d78e6}{af}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{ng__cisco_8c_source_l00091}{91}} of file \mbox{\hyperlink{ng__cisco_8c_source}{ng\+\_\+cisco.\+c}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structprotoent_a893376ddc0a43c574731d8058e6d78e6}\label{structprotoent_a893376ddc0a43c574731d8058e6d78e6}} 
\index{protoent@{protoent}!af@{af}}
\index{af@{af}!protoent@{protoent}}
\doxysubsubsection{\texorpdfstring{af}{af}}
{\footnotesize\ttfamily uint16\+\_\+t protoent\+::af}



Definition at line \mbox{\hyperlink{ng__cisco_8c_source_l00093}{93}} of file \mbox{\hyperlink{ng__cisco_8c_source}{ng\+\_\+cisco.\+c}}.



Referenced by \mbox{\hyperlink{ng__cisco_8c_source_l00415}{cisco\+\_\+disconnect()}}, and \mbox{\hyperlink{ng__cisco_8c_source_l00340}{cisco\+\_\+rcvdata()}}.

\mbox{\Hypertarget{structprotoent_a7a1bb639692da821273ee5f7d5850ef4}\label{structprotoent_a7a1bb639692da821273ee5f7d5850ef4}} 
\index{protoent@{protoent}!hook@{hook}}
\index{hook@{hook}!protoent@{protoent}}
\doxysubsubsection{\texorpdfstring{hook}{hook}}
{\footnotesize\ttfamily \mbox{\hyperlink{netgraph_8h_ab3a2553a36b03752ec05a6d4ca11d8a3}{hook\+\_\+p}} protoent\+::hook}



Definition at line \mbox{\hyperlink{ng__cisco_8c_source_l00092}{92}} of file \mbox{\hyperlink{ng__cisco_8c_source}{ng\+\_\+cisco.\+c}}.



Referenced by \mbox{\hyperlink{ng__cisco_8c_source_l00415}{cisco\+\_\+disconnect()}}, and \mbox{\hyperlink{ng__cisco_8c_source_l00439}{cisco\+\_\+input()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
netgraph/\mbox{\hyperlink{ng__cisco_8c}{ng\+\_\+cisco.\+c}}\end{DoxyCompactItemize}
