\hypertarget{structnetflow__v1__header}{}\doxysection{netflow\+\_\+v1\+\_\+header Struct Reference}
\label{structnetflow__v1__header}\index{netflow\_v1\_header@{netflow\_v1\_header}}


{\ttfamily \#include $<$netflow.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
uint16\+\_\+t \mbox{\hyperlink{structnetflow__v1__header_a78437eb9d2177000618ad3d84861967a}{version}}
\item 
uint16\+\_\+t \mbox{\hyperlink{structnetflow__v1__header_a4b4f9b6a4bf8d8ae754a48a95aa86649}{count}}
\item 
uint32\+\_\+t \mbox{\hyperlink{structnetflow__v1__header_a54d9a8d5a381b7fffc7ffb99a151c208}{sys\+\_\+uptime}}
\item 
uint32\+\_\+t \mbox{\hyperlink{structnetflow__v1__header_a52244e25badb4b9e494562167eec8f3e}{unix\+\_\+secs}}
\item 
uint32\+\_\+t \mbox{\hyperlink{structnetflow__v1__header_a772ff4caebf110134b997848866f2310}{unix\+\_\+nsecs}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{netflow_8h_source_l00057}{57}} of file \mbox{\hyperlink{netflow_8h_source}{netflow.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structnetflow__v1__header_a4b4f9b6a4bf8d8ae754a48a95aa86649}\label{structnetflow__v1__header_a4b4f9b6a4bf8d8ae754a48a95aa86649}} 
\index{netflow\_v1\_header@{netflow\_v1\_header}!count@{count}}
\index{count@{count}!netflow\_v1\_header@{netflow\_v1\_header}}
\doxysubsubsection{\texorpdfstring{count}{count}}
{\footnotesize\ttfamily uint16\+\_\+t netflow\+\_\+v1\+\_\+header\+::count}



Definition at line \mbox{\hyperlink{netflow_8h_source_l00060}{60}} of file \mbox{\hyperlink{netflow_8h_source}{netflow.\+h}}.

\mbox{\Hypertarget{structnetflow__v1__header_a54d9a8d5a381b7fffc7ffb99a151c208}\label{structnetflow__v1__header_a54d9a8d5a381b7fffc7ffb99a151c208}} 
\index{netflow\_v1\_header@{netflow\_v1\_header}!sys\_uptime@{sys\_uptime}}
\index{sys\_uptime@{sys\_uptime}!netflow\_v1\_header@{netflow\_v1\_header}}
\doxysubsubsection{\texorpdfstring{sys\_uptime}{sys\_uptime}}
{\footnotesize\ttfamily uint32\+\_\+t netflow\+\_\+v1\+\_\+header\+::sys\+\_\+uptime}



Definition at line \mbox{\hyperlink{netflow_8h_source_l00061}{61}} of file \mbox{\hyperlink{netflow_8h_source}{netflow.\+h}}.

\mbox{\Hypertarget{structnetflow__v1__header_a772ff4caebf110134b997848866f2310}\label{structnetflow__v1__header_a772ff4caebf110134b997848866f2310}} 
\index{netflow\_v1\_header@{netflow\_v1\_header}!unix\_nsecs@{unix\_nsecs}}
\index{unix\_nsecs@{unix\_nsecs}!netflow\_v1\_header@{netflow\_v1\_header}}
\doxysubsubsection{\texorpdfstring{unix\_nsecs}{unix\_nsecs}}
{\footnotesize\ttfamily uint32\+\_\+t netflow\+\_\+v1\+\_\+header\+::unix\+\_\+nsecs}



Definition at line \mbox{\hyperlink{netflow_8h_source_l00063}{63}} of file \mbox{\hyperlink{netflow_8h_source}{netflow.\+h}}.

\mbox{\Hypertarget{structnetflow__v1__header_a52244e25badb4b9e494562167eec8f3e}\label{structnetflow__v1__header_a52244e25badb4b9e494562167eec8f3e}} 
\index{netflow\_v1\_header@{netflow\_v1\_header}!unix\_secs@{unix\_secs}}
\index{unix\_secs@{unix\_secs}!netflow\_v1\_header@{netflow\_v1\_header}}
\doxysubsubsection{\texorpdfstring{unix\_secs}{unix\_secs}}
{\footnotesize\ttfamily uint32\+\_\+t netflow\+\_\+v1\+\_\+header\+::unix\+\_\+secs}



Definition at line \mbox{\hyperlink{netflow_8h_source_l00062}{62}} of file \mbox{\hyperlink{netflow_8h_source}{netflow.\+h}}.

\mbox{\Hypertarget{structnetflow__v1__header_a78437eb9d2177000618ad3d84861967a}\label{structnetflow__v1__header_a78437eb9d2177000618ad3d84861967a}} 
\index{netflow\_v1\_header@{netflow\_v1\_header}!version@{version}}
\index{version@{version}!netflow\_v1\_header@{netflow\_v1\_header}}
\doxysubsubsection{\texorpdfstring{version}{version}}
{\footnotesize\ttfamily uint16\+\_\+t netflow\+\_\+v1\+\_\+header\+::version}



Definition at line \mbox{\hyperlink{netflow_8h_source_l00059}{59}} of file \mbox{\hyperlink{netflow_8h_source}{netflow.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
netgraph/netflow/\mbox{\hyperlink{netflow_8h}{netflow.\+h}}\end{DoxyCompactItemize}
