\hypertarget{structieee80211__radio__event}{}\doxysection{ieee80211\+\_\+radio\+\_\+event Struct Reference}
\label{structieee80211__radio__event}\index{ieee80211\_radio\_event@{ieee80211\_radio\_event}}


{\ttfamily \#include $<$ieee80211\+\_\+freebsd.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
uint8\+\_\+t \mbox{\hyperlink{structieee80211__radio__event_a2ff1e386d40cfca084d23265d218928b}{iev\+\_\+state}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{ieee80211__freebsd_8h_source_l00612}{612}} of file \mbox{\hyperlink{ieee80211__freebsd_8h_source}{ieee80211\+\_\+freebsd.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structieee80211__radio__event_a2ff1e386d40cfca084d23265d218928b}\label{structieee80211__radio__event_a2ff1e386d40cfca084d23265d218928b}} 
\index{ieee80211\_radio\_event@{ieee80211\_radio\_event}!iev\_state@{iev\_state}}
\index{iev\_state@{iev\_state}!ieee80211\_radio\_event@{ieee80211\_radio\_event}}
\doxysubsubsection{\texorpdfstring{iev\_state}{iev\_state}}
{\footnotesize\ttfamily uint8\+\_\+t ieee80211\+\_\+radio\+\_\+event\+::iev\+\_\+state}



Definition at line \mbox{\hyperlink{ieee80211__freebsd_8h_source_l00613}{613}} of file \mbox{\hyperlink{ieee80211__freebsd_8h_source}{ieee80211\+\_\+freebsd.\+h}}.



Referenced by \mbox{\hyperlink{ieee80211__freebsd_8c_source_l01001}{ieee80211\+\_\+notify\+\_\+radio()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
net80211/\mbox{\hyperlink{ieee80211__freebsd_8h}{ieee80211\+\_\+freebsd.\+h}}\end{DoxyCompactItemize}
