\hypertarget{structclock__getres__args}{}\doxysection{clock\+\_\+getres\+\_\+args Struct Reference}
\label{structclock__getres__args}\index{clock\_getres\_args@{clock\_getres\_args}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
clockid\+\_\+t \mbox{\hyperlink{structclock__getres__args_a2ea7283bd15feec4c1baabfb266ccd74}{clock\+\_\+id}}
\item 
struct timespec $\ast$ \mbox{\hyperlink{structclock__getres__args_ae42d2d4285cea9fcb62754543ea15bd7}{tp}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{kern__time_8c_source_l00426}{426}} of file \mbox{\hyperlink{kern__time_8c_source}{kern\+\_\+time.\+c}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structclock__getres__args_a2ea7283bd15feec4c1baabfb266ccd74}\label{structclock__getres__args_a2ea7283bd15feec4c1baabfb266ccd74}} 
\index{clock\_getres\_args@{clock\_getres\_args}!clock\_id@{clock\_id}}
\index{clock\_id@{clock\_id}!clock\_getres\_args@{clock\_getres\_args}}
\doxysubsubsection{\texorpdfstring{clock\_id}{clock\_id}}
{\footnotesize\ttfamily clockid\+\_\+t clock\+\_\+getres\+\_\+args\+::clock\+\_\+id}



Definition at line \mbox{\hyperlink{kern__time_8c_source_l00427}{427}} of file \mbox{\hyperlink{kern__time_8c_source}{kern\+\_\+time.\+c}}.



Referenced by \mbox{\hyperlink{kern__time_8c_source_l00432}{sys\+\_\+clock\+\_\+getres()}}, and \mbox{\hyperlink{systrace__args_8c_source_l00010}{systrace\+\_\+args()}}.

\mbox{\Hypertarget{structclock__getres__args_ae42d2d4285cea9fcb62754543ea15bd7}\label{structclock__getres__args_ae42d2d4285cea9fcb62754543ea15bd7}} 
\index{clock\_getres\_args@{clock\_getres\_args}!tp@{tp}}
\index{tp@{tp}!clock\_getres\_args@{clock\_getres\_args}}
\doxysubsubsection{\texorpdfstring{tp}{tp}}
{\footnotesize\ttfamily struct timespec$\ast$ clock\+\_\+getres\+\_\+args\+::tp}



Definition at line \mbox{\hyperlink{kern__time_8c_source_l00428}{428}} of file \mbox{\hyperlink{kern__time_8c_source}{kern\+\_\+time.\+c}}.



Referenced by \mbox{\hyperlink{kern__time_8c_source_l00432}{sys\+\_\+clock\+\_\+getres()}}, and \mbox{\hyperlink{systrace__args_8c_source_l00010}{systrace\+\_\+args()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kern/\mbox{\hyperlink{kern__time_8c}{kern\+\_\+time.\+c}}\end{DoxyCompactItemize}
