\hypertarget{structohci__hcca}{}\doxysection{ohci\+\_\+hcca Struct Reference}
\label{structohci__hcca}\index{ohci\_hcca@{ohci\_hcca}}


{\ttfamily \#include $<$ohci.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
volatile uint32\+\_\+t \mbox{\hyperlink{structohci__hcca_a648020a89c0be7ec9b1da400be6cc217}{hcca\+\_\+interrupt\+\_\+table}} \mbox{[}\mbox{\hyperlink{ohci_8h_a87fdd7a9915c2e5bdadcc518f23e97ce}{OHCI\+\_\+\+NO\+\_\+\+INTRS}}\mbox{]}
\item 
volatile uint32\+\_\+t \mbox{\hyperlink{structohci__hcca_af6320e8c35179d1f314bef207480cfe9}{hcca\+\_\+frame\+\_\+number}}
\item 
volatile uint32\+\_\+t \mbox{\hyperlink{structohci__hcca_af34f7bc57ad8f1a8fa62e54cc40ca7a4}{hcca\+\_\+done\+\_\+head}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{ohci_8h_source_l00066}{66}} of file \mbox{\hyperlink{ohci_8h_source}{ohci.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structohci__hcca_af34f7bc57ad8f1a8fa62e54cc40ca7a4}\label{structohci__hcca_af34f7bc57ad8f1a8fa62e54cc40ca7a4}} 
\index{ohci\_hcca@{ohci\_hcca}!hcca\_done\_head@{hcca\_done\_head}}
\index{hcca\_done\_head@{hcca\_done\_head}!ohci\_hcca@{ohci\_hcca}}
\doxysubsubsection{\texorpdfstring{hcca\_done\_head}{hcca\_done\_head}}
{\footnotesize\ttfamily volatile uint32\+\_\+t ohci\+\_\+hcca\+::hcca\+\_\+done\+\_\+head}



Definition at line \mbox{\hyperlink{ohci_8h_source_l00069}{69}} of file \mbox{\hyperlink{ohci_8h_source}{ohci.\+h}}.



Referenced by \mbox{\hyperlink{ohci_8c_source_l01106}{ohci\+\_\+interrupt()}}.

\mbox{\Hypertarget{structohci__hcca_af6320e8c35179d1f314bef207480cfe9}\label{structohci__hcca_af6320e8c35179d1f314bef207480cfe9}} 
\index{ohci\_hcca@{ohci\_hcca}!hcca\_frame\_number@{hcca\_frame\_number}}
\index{hcca\_frame\_number@{hcca\_frame\_number}!ohci\_hcca@{ohci\_hcca}}
\doxysubsubsection{\texorpdfstring{hcca\_frame\_number}{hcca\_frame\_number}}
{\footnotesize\ttfamily volatile uint32\+\_\+t ohci\+\_\+hcca\+::hcca\+\_\+frame\+\_\+number}



Definition at line \mbox{\hyperlink{ohci_8h_source_l00068}{68}} of file \mbox{\hyperlink{ohci_8h_source}{ohci.\+h}}.



Referenced by \mbox{\hyperlink{ohci_8c_source_l01820}{ohci\+\_\+device\+\_\+isoc\+\_\+enter()}}.

\mbox{\Hypertarget{structohci__hcca_a648020a89c0be7ec9b1da400be6cc217}\label{structohci__hcca_a648020a89c0be7ec9b1da400be6cc217}} 
\index{ohci\_hcca@{ohci\_hcca}!hcca\_interrupt\_table@{hcca\_interrupt\_table}}
\index{hcca\_interrupt\_table@{hcca\_interrupt\_table}!ohci\_hcca@{ohci\_hcca}}
\doxysubsubsection{\texorpdfstring{hcca\_interrupt\_table}{hcca\_interrupt\_table}}
{\footnotesize\ttfamily volatile uint32\+\_\+t ohci\+\_\+hcca\+::hcca\+\_\+interrupt\+\_\+table\mbox{[}\mbox{\hyperlink{ohci_8h_a87fdd7a9915c2e5bdadcc518f23e97ce}{OHCI\+\_\+\+NO\+\_\+\+INTRS}}\mbox{]}}



Definition at line \mbox{\hyperlink{ohci_8h_source_l00067}{67}} of file \mbox{\hyperlink{ohci_8h_source}{ohci.\+h}}.



Referenced by \mbox{\hyperlink{ohci_8c_source_l00323}{ohci\+\_\+init()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/usb/controller/\mbox{\hyperlink{ohci_8h}{ohci.\+h}}\end{DoxyCompactItemize}
