\hypertarget{structusb__status}{}\doxysection{usb\+\_\+status Struct Reference}
\label{structusb__status}\index{usb\_status@{usb\_status}}


{\ttfamily \#include $<$usb.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{usb__endian_8h_ad3086c1130ab6b88c53220166e3b5129}{u\+Word}} \mbox{\hyperlink{structusb__status_aa56f46e2ca05aa6427ed3e02b07225ff}{w\+Status}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{usb_8h_source_l00685}{685}} of file \mbox{\hyperlink{usb_8h_source}{usb.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structusb__status_aa56f46e2ca05aa6427ed3e02b07225ff}\label{structusb__status_aa56f46e2ca05aa6427ed3e02b07225ff}} 
\index{usb\_status@{usb\_status}!wStatus@{wStatus}}
\index{wStatus@{wStatus}!usb\_status@{usb\_status}}
\doxysubsubsection{\texorpdfstring{wStatus}{wStatus}}
{\footnotesize\ttfamily \mbox{\hyperlink{usb__endian_8h_ad3086c1130ab6b88c53220166e3b5129}{u\+Word}} usb\+\_\+status\+::w\+Status}



Definition at line \mbox{\hyperlink{usb_8h_source_l00686}{686}} of file \mbox{\hyperlink{usb_8h_source}{usb.\+h}}.



Referenced by \mbox{\hyperlink{ehci_8c_source_l02998}{ehci\+\_\+roothub\+\_\+exec()}}, \mbox{\hyperlink{ohci_8c_source_l02049}{ohci\+\_\+roothub\+\_\+exec()}}, \mbox{\hyperlink{uhci_8c_source_l02418}{uhci\+\_\+roothub\+\_\+exec()}}, \mbox{\hyperlink{usb__device_8c_source_l00672}{usbd\+\_\+set\+\_\+config\+\_\+index()}}, and \mbox{\hyperlink{xhci_8c_source_l03214}{xhci\+\_\+roothub\+\_\+exec()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/usb/\mbox{\hyperlink{usb_8h}{usb.\+h}}\end{DoxyCompactItemize}
