\hypertarget{structucom__cfg__task}{}\doxysection{ucom\+\_\+cfg\+\_\+task Struct Reference}
\label{structucom__cfg__task}\index{ucom\_cfg\_task@{ucom\_cfg\_task}}


{\ttfamily \#include $<$usb\+\_\+serial.\+h$>$}



Collaboration diagram for ucom\+\_\+cfg\+\_\+task\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{de/d1b/structucom__cfg__task__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
struct \mbox{\hyperlink{structusb__proc__msg}{usb\+\_\+proc\+\_\+msg}} \mbox{\hyperlink{structucom__cfg__task_ae0f9eb21525f8c0b6f11f724a91b9d7c}{hdr}}
\item 
struct \mbox{\hyperlink{structucom__softc}{ucom\+\_\+softc}} $\ast$ \mbox{\hyperlink{structucom__cfg__task_a4e9b8b987ee74fe386e91c471e2aa101}{sc}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{usb__serial_8h_source_l00121}{121}} of file \mbox{\hyperlink{usb__serial_8h_source}{usb\+\_\+serial.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structucom__cfg__task_ae0f9eb21525f8c0b6f11f724a91b9d7c}\label{structucom__cfg__task_ae0f9eb21525f8c0b6f11f724a91b9d7c}} 
\index{ucom\_cfg\_task@{ucom\_cfg\_task}!hdr@{hdr}}
\index{hdr@{hdr}!ucom\_cfg\_task@{ucom\_cfg\_task}}
\doxysubsubsection{\texorpdfstring{hdr}{hdr}}
{\footnotesize\ttfamily struct \mbox{\hyperlink{structusb__proc__msg}{usb\+\_\+proc\+\_\+msg}} ucom\+\_\+cfg\+\_\+task\+::hdr}



Definition at line \mbox{\hyperlink{usb__serial_8h_source_l00122}{122}} of file \mbox{\hyperlink{usb__serial_8h_source}{usb\+\_\+serial.\+h}}.



Referenced by \mbox{\hyperlink{usb__serial_8c_source_l00827}{ucom\+\_\+close()}}, \mbox{\hyperlink{usb__serial_8c_source_l01065}{ucom\+\_\+line\+\_\+state()}}, \mbox{\hyperlink{usb__serial_8c_source_l00743}{ucom\+\_\+open()}}, \mbox{\hyperlink{usb__serial_8c_source_l01267}{ucom\+\_\+param()}}, and \mbox{\hyperlink{usb__serial_8c_source_l01229}{ucom\+\_\+status\+\_\+change()}}.

\mbox{\Hypertarget{structucom__cfg__task_a4e9b8b987ee74fe386e91c471e2aa101}\label{structucom__cfg__task_a4e9b8b987ee74fe386e91c471e2aa101}} 
\index{ucom\_cfg\_task@{ucom\_cfg\_task}!sc@{sc}}
\index{sc@{sc}!ucom\_cfg\_task@{ucom\_cfg\_task}}
\doxysubsubsection{\texorpdfstring{sc}{sc}}
{\footnotesize\ttfamily struct \mbox{\hyperlink{structucom__softc}{ucom\+\_\+softc}}$\ast$ ucom\+\_\+cfg\+\_\+task\+::sc}



Definition at line \mbox{\hyperlink{usb__serial_8h_source_l00123}{123}} of file \mbox{\hyperlink{usb__serial_8h_source}{usb\+\_\+serial.\+h}}.



Referenced by \mbox{\hyperlink{usb__serial_8c_source_l00809}{ucom\+\_\+cfg\+\_\+close()}}, \mbox{\hyperlink{usb__serial_8c_source_l00998}{ucom\+\_\+cfg\+\_\+line\+\_\+state()}}, \mbox{\hyperlink{usb__serial_8c_source_l00719}{ucom\+\_\+cfg\+\_\+open()}}, \mbox{\hyperlink{usb__serial_8c_source_l00675}{ucom\+\_\+cfg\+\_\+start\+\_\+transfers()}}, and \mbox{\hyperlink{usb__serial_8c_source_l01133}{ucom\+\_\+cfg\+\_\+status\+\_\+change()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/usb/serial/\mbox{\hyperlink{usb__serial_8h}{usb\+\_\+serial.\+h}}\end{DoxyCompactItemize}
