\hypertarget{structatp__stroke}{}\doxysection{atp\+\_\+stroke Struct Reference}
\label{structatp__stroke}\index{atp\_stroke@{atp\_stroke}}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{atp_8c_source_l00616}{616}} of file \mbox{\hyperlink{atp_8c_source}{atp.\+c}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/usb/input/\mbox{\hyperlink{atp_8c}{atp.\+c}}\end{DoxyCompactItemize}
