\hypertarget{structusb__temp__interval}{}\doxysection{usb\+\_\+temp\+\_\+interval Struct Reference}
\label{structusb__temp__interval}\index{usb\_temp\_interval@{usb\_temp\_interval}}


{\ttfamily \#include $<$usb\+\_\+template.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
uint8\+\_\+t \mbox{\hyperlink{structusb__temp__interval_a5cd37cfd16db2cf6c5c87e30cbd678c1}{b\+Interval}} \mbox{[}\mbox{\hyperlink{usb_8h_a3c4bce858023c9ab927edf6d748809ce}{USB\+\_\+\+SPEED\+\_\+\+MAX}}\mbox{]}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{usb__template_8h_source_l00051}{51}} of file \mbox{\hyperlink{usb__template_8h_source}{usb\+\_\+template.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structusb__temp__interval_a5cd37cfd16db2cf6c5c87e30cbd678c1}\label{structusb__temp__interval_a5cd37cfd16db2cf6c5c87e30cbd678c1}} 
\index{usb\_temp\_interval@{usb\_temp\_interval}!bInterval@{bInterval}}
\index{bInterval@{bInterval}!usb\_temp\_interval@{usb\_temp\_interval}}
\doxysubsubsection{\texorpdfstring{bInterval}{bInterval}}
{\footnotesize\ttfamily uint8\+\_\+t usb\+\_\+temp\+\_\+interval\+::b\+Interval\mbox{[}\mbox{\hyperlink{usb_8h_a3c4bce858023c9ab927edf6d748809ce}{USB\+\_\+\+SPEED\+\_\+\+MAX}}\mbox{]}}



Definition at line \mbox{\hyperlink{usb__template_8h_source_l00052}{52}} of file \mbox{\hyperlink{usb__template_8h_source}{usb\+\_\+template.\+h}}.



Referenced by \mbox{\hyperlink{usb__template_8c_source_l00267}{usb\+\_\+make\+\_\+endpoint\+\_\+desc()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/usb/template/\mbox{\hyperlink{usb__template_8h}{usb\+\_\+template.\+h}}\end{DoxyCompactItemize}
