\hypertarget{structusb__otg__descriptor}{}\doxysection{usb\+\_\+otg\+\_\+descriptor Struct Reference}
\label{structusb__otg__descriptor}\index{usb\_otg\_descriptor@{usb\_otg\_descriptor}}


{\ttfamily \#include $<$usb.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{usb__endian_8h_a4dea376b5cd0c5d694660473f5e7a459}{u\+Byte}} \mbox{\hyperlink{structusb__otg__descriptor_a8401436da85e34add261c154e465a808}{b\+Length}}
\item 
\mbox{\hyperlink{usb__endian_8h_a4dea376b5cd0c5d694660473f5e7a459}{u\+Byte}} \mbox{\hyperlink{structusb__otg__descriptor_a23cd4904356f26b77c8cd295e2472735}{b\+Descriptor\+Type}}
\item 
\mbox{\hyperlink{usb__endian_8h_a4dea376b5cd0c5d694660473f5e7a459}{u\+Byte}} \mbox{\hyperlink{structusb__otg__descriptor_a7dc7354beccb946a60d4826085741674}{bm\+Attributes}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{usb_8h_source_l00671}{671}} of file \mbox{\hyperlink{usb_8h_source}{usb.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structusb__otg__descriptor_a23cd4904356f26b77c8cd295e2472735}\label{structusb__otg__descriptor_a23cd4904356f26b77c8cd295e2472735}} 
\index{usb\_otg\_descriptor@{usb\_otg\_descriptor}!bDescriptorType@{bDescriptorType}}
\index{bDescriptorType@{bDescriptorType}!usb\_otg\_descriptor@{usb\_otg\_descriptor}}
\doxysubsubsection{\texorpdfstring{bDescriptorType}{bDescriptorType}}
{\footnotesize\ttfamily \mbox{\hyperlink{usb__endian_8h_a4dea376b5cd0c5d694660473f5e7a459}{u\+Byte}} usb\+\_\+otg\+\_\+descriptor\+::b\+Descriptor\+Type}



Definition at line \mbox{\hyperlink{usb_8h_source_l00673}{673}} of file \mbox{\hyperlink{usb_8h_source}{usb.\+h}}.

\mbox{\Hypertarget{structusb__otg__descriptor_a8401436da85e34add261c154e465a808}\label{structusb__otg__descriptor_a8401436da85e34add261c154e465a808}} 
\index{usb\_otg\_descriptor@{usb\_otg\_descriptor}!bLength@{bLength}}
\index{bLength@{bLength}!usb\_otg\_descriptor@{usb\_otg\_descriptor}}
\doxysubsubsection{\texorpdfstring{bLength}{bLength}}
{\footnotesize\ttfamily \mbox{\hyperlink{usb__endian_8h_a4dea376b5cd0c5d694660473f5e7a459}{u\+Byte}} usb\+\_\+otg\+\_\+descriptor\+::b\+Length}



Definition at line \mbox{\hyperlink{usb_8h_source_l00672}{672}} of file \mbox{\hyperlink{usb_8h_source}{usb.\+h}}.

\mbox{\Hypertarget{structusb__otg__descriptor_a7dc7354beccb946a60d4826085741674}\label{structusb__otg__descriptor_a7dc7354beccb946a60d4826085741674}} 
\index{usb\_otg\_descriptor@{usb\_otg\_descriptor}!bmAttributes@{bmAttributes}}
\index{bmAttributes@{bmAttributes}!usb\_otg\_descriptor@{usb\_otg\_descriptor}}
\doxysubsubsection{\texorpdfstring{bmAttributes}{bmAttributes}}
{\footnotesize\ttfamily \mbox{\hyperlink{usb__endian_8h_a4dea376b5cd0c5d694660473f5e7a459}{u\+Byte}} usb\+\_\+otg\+\_\+descriptor\+::bm\+Attributes}



Definition at line \mbox{\hyperlink{usb_8h_source_l00674}{674}} of file \mbox{\hyperlink{usb_8h_source}{usb.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/usb/\mbox{\hyperlink{usb_8h}{usb.\+h}}\end{DoxyCompactItemize}
