\hypertarget{structmlx5__health__buffer}{}\doxysection{mlx5\+\_\+health\+\_\+buffer Struct Reference}
\label{structmlx5__health__buffer}\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}}


{\ttfamily \#include $<$device.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\+\_\+\+\_\+be32 \mbox{\hyperlink{structmlx5__health__buffer_ab5c08f5c6af84a4253acd9b5764665a4}{assert\+\_\+var}} \mbox{[}5\mbox{]}
\item 
\+\_\+\+\_\+be32 \mbox{\hyperlink{structmlx5__health__buffer_ad5f30d3670d551a9ee1fcde82f547e1c}{rsvd0}} \mbox{[}3\mbox{]}
\item 
\+\_\+\+\_\+be32 \mbox{\hyperlink{structmlx5__health__buffer_aecb4601da1d0deebc386417614c6d4bc}{assert\+\_\+exit\+\_\+ptr}}
\item 
\+\_\+\+\_\+be32 \mbox{\hyperlink{structmlx5__health__buffer_a1bc3279ae53d499f88a5b67809cf2387}{assert\+\_\+callra}}
\item 
\+\_\+\+\_\+be32 \mbox{\hyperlink{structmlx5__health__buffer_a9c9652037610262e19d2c70a18e41a14}{rsvd1}} \mbox{[}2\mbox{]}
\item 
\+\_\+\+\_\+be32 \mbox{\hyperlink{structmlx5__health__buffer_afe7319b6ec5633ac2a6173b7b6532019}{fw\+\_\+ver}}
\item 
\+\_\+\+\_\+be32 \mbox{\hyperlink{structmlx5__health__buffer_acd63aa1783db9310c5c4350bda655a2c}{hw\+\_\+id}}
\item 
\+\_\+\+\_\+be32 \mbox{\hyperlink{structmlx5__health__buffer_a611f5b7c51defbd51f35e06f7f9dcc4a}{rfr}}
\item 
u8 \mbox{\hyperlink{structmlx5__health__buffer_a533af47c2a40edc131fceb721c604987}{irisc\+\_\+index}}
\item 
u8 \mbox{\hyperlink{structmlx5__health__buffer_ac9c34e58941b2ea0a292a9ae808e10d2}{synd}}
\item 
\+\_\+\+\_\+be16 \mbox{\hyperlink{structmlx5__health__buffer_a9683fc888817caa33328b4ffde20f1a3}{ext\+\_\+synd}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{device_8h_source_l00466}{466}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structmlx5__health__buffer_a1bc3279ae53d499f88a5b67809cf2387}\label{structmlx5__health__buffer_a1bc3279ae53d499f88a5b67809cf2387}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!assert\_callra@{assert\_callra}}
\index{assert\_callra@{assert\_callra}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{assert\_callra}{assert\_callra}}
{\footnotesize\ttfamily \+\_\+\+\_\+be32 mlx5\+\_\+health\+\_\+buffer\+::assert\+\_\+callra}



Definition at line \mbox{\hyperlink{device_8h_source_l00470}{470}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.



Referenced by \mbox{\hyperlink{mlx5__health_8c_source_l00506}{print\+\_\+health\+\_\+info()}}.

\mbox{\Hypertarget{structmlx5__health__buffer_aecb4601da1d0deebc386417614c6d4bc}\label{structmlx5__health__buffer_aecb4601da1d0deebc386417614c6d4bc}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!assert\_exit\_ptr@{assert\_exit\_ptr}}
\index{assert\_exit\_ptr@{assert\_exit\_ptr}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{assert\_exit\_ptr}{assert\_exit\_ptr}}
{\footnotesize\ttfamily \+\_\+\+\_\+be32 mlx5\+\_\+health\+\_\+buffer\+::assert\+\_\+exit\+\_\+ptr}



Definition at line \mbox{\hyperlink{device_8h_source_l00469}{469}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.



Referenced by \mbox{\hyperlink{mlx5__health_8c_source_l00506}{print\+\_\+health\+\_\+info()}}.

\mbox{\Hypertarget{structmlx5__health__buffer_ab5c08f5c6af84a4253acd9b5764665a4}\label{structmlx5__health__buffer_ab5c08f5c6af84a4253acd9b5764665a4}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!assert\_var@{assert\_var}}
\index{assert\_var@{assert\_var}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{assert\_var}{assert\_var}}
{\footnotesize\ttfamily \+\_\+\+\_\+be32 mlx5\+\_\+health\+\_\+buffer\+::assert\+\_\+var\mbox{[}5\mbox{]}}



Definition at line \mbox{\hyperlink{device_8h_source_l00467}{467}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.



Referenced by \mbox{\hyperlink{mlx5__health_8c_source_l00506}{print\+\_\+health\+\_\+info()}}.

\mbox{\Hypertarget{structmlx5__health__buffer_a9683fc888817caa33328b4ffde20f1a3}\label{structmlx5__health__buffer_a9683fc888817caa33328b4ffde20f1a3}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!ext\_synd@{ext\_synd}}
\index{ext\_synd@{ext\_synd}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{ext\_synd}{ext\_synd}}
{\footnotesize\ttfamily \+\_\+\+\_\+be16 mlx5\+\_\+health\+\_\+buffer\+::ext\+\_\+synd}



Definition at line \mbox{\hyperlink{device_8h_source_l00477}{477}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.



Referenced by \mbox{\hyperlink{mlx5__health_8c_source_l00506}{print\+\_\+health\+\_\+info()}}.

\mbox{\Hypertarget{structmlx5__health__buffer_afe7319b6ec5633ac2a6173b7b6532019}\label{structmlx5__health__buffer_afe7319b6ec5633ac2a6173b7b6532019}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!fw\_ver@{fw\_ver}}
\index{fw\_ver@{fw\_ver}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{fw\_ver}{fw\_ver}}
{\footnotesize\ttfamily \+\_\+\+\_\+be32 mlx5\+\_\+health\+\_\+buffer\+::fw\+\_\+ver}



Definition at line \mbox{\hyperlink{device_8h_source_l00472}{472}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.



Referenced by \mbox{\hyperlink{mlx5__health_8c_source_l00506}{print\+\_\+health\+\_\+info()}}, and \mbox{\hyperlink{mlx5__health_8c_source_l00168}{sensor\+\_\+pci\+\_\+no\+\_\+comm()}}.

\mbox{\Hypertarget{structmlx5__health__buffer_acd63aa1783db9310c5c4350bda655a2c}\label{structmlx5__health__buffer_acd63aa1783db9310c5c4350bda655a2c}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!hw\_id@{hw\_id}}
\index{hw\_id@{hw\_id}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{hw\_id}{hw\_id}}
{\footnotesize\ttfamily \+\_\+\+\_\+be32 mlx5\+\_\+health\+\_\+buffer\+::hw\+\_\+id}



Definition at line \mbox{\hyperlink{device_8h_source_l00473}{473}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.



Referenced by \mbox{\hyperlink{mlx5__health_8c_source_l00506}{print\+\_\+health\+\_\+info()}}.

\mbox{\Hypertarget{structmlx5__health__buffer_a533af47c2a40edc131fceb721c604987}\label{structmlx5__health__buffer_a533af47c2a40edc131fceb721c604987}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!irisc\_index@{irisc\_index}}
\index{irisc\_index@{irisc\_index}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{irisc\_index}{irisc\_index}}
{\footnotesize\ttfamily u8 mlx5\+\_\+health\+\_\+buffer\+::irisc\+\_\+index}



Definition at line \mbox{\hyperlink{device_8h_source_l00475}{475}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.



Referenced by \mbox{\hyperlink{mlx5__health_8c_source_l00506}{print\+\_\+health\+\_\+info()}}.

\mbox{\Hypertarget{structmlx5__health__buffer_a611f5b7c51defbd51f35e06f7f9dcc4a}\label{structmlx5__health__buffer_a611f5b7c51defbd51f35e06f7f9dcc4a}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!rfr@{rfr}}
\index{rfr@{rfr}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{rfr}{rfr}}
{\footnotesize\ttfamily \+\_\+\+\_\+be32 mlx5\+\_\+health\+\_\+buffer\+::rfr}



Definition at line \mbox{\hyperlink{device_8h_source_l00474}{474}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.



Referenced by \mbox{\hyperlink{mlx5__health_8c_source_l00131}{sensor\+\_\+fw\+\_\+synd\+\_\+rfr()}}.

\mbox{\Hypertarget{structmlx5__health__buffer_ad5f30d3670d551a9ee1fcde82f547e1c}\label{structmlx5__health__buffer_ad5f30d3670d551a9ee1fcde82f547e1c}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!rsvd0@{rsvd0}}
\index{rsvd0@{rsvd0}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{rsvd0}{rsvd0}}
{\footnotesize\ttfamily \+\_\+\+\_\+be32 mlx5\+\_\+health\+\_\+buffer\+::rsvd0\mbox{[}3\mbox{]}}



Definition at line \mbox{\hyperlink{device_8h_source_l00468}{468}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.

\mbox{\Hypertarget{structmlx5__health__buffer_a9c9652037610262e19d2c70a18e41a14}\label{structmlx5__health__buffer_a9c9652037610262e19d2c70a18e41a14}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!rsvd1@{rsvd1}}
\index{rsvd1@{rsvd1}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{rsvd1}{rsvd1}}
{\footnotesize\ttfamily \+\_\+\+\_\+be32 mlx5\+\_\+health\+\_\+buffer\+::rsvd1\mbox{[}2\mbox{]}}



Definition at line \mbox{\hyperlink{device_8h_source_l00471}{471}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.

\mbox{\Hypertarget{structmlx5__health__buffer_ac9c34e58941b2ea0a292a9ae808e10d2}\label{structmlx5__health__buffer_ac9c34e58941b2ea0a292a9ae808e10d2}} 
\index{mlx5\_health\_buffer@{mlx5\_health\_buffer}!synd@{synd}}
\index{synd@{synd}!mlx5\_health\_buffer@{mlx5\_health\_buffer}}
\doxysubsubsection{\texorpdfstring{synd}{synd}}
{\footnotesize\ttfamily u8 mlx5\+\_\+health\+\_\+buffer\+::synd}



Definition at line \mbox{\hyperlink{device_8h_source_l00476}{476}} of file \mbox{\hyperlink{device_8h_source}{device.\+h}}.



Referenced by \mbox{\hyperlink{mlx5__health_8c_source_l00506}{print\+\_\+health\+\_\+info()}}, and \mbox{\hyperlink{mlx5__health_8c_source_l00131}{sensor\+\_\+fw\+\_\+synd\+\_\+rfr()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/mlx5/\mbox{\hyperlink{device_8h}{device.\+h}}\end{DoxyCompactItemize}
