\hypertarget{structtruephy__dsp}{}\doxysection{truephy\+\_\+dsp Struct Reference}
\label{structtruephy__dsp}\index{truephy\_dsp@{truephy\_dsp}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
uint16\+\_\+t \mbox{\hyperlink{structtruephy__dsp_aeb7e391432e3e1640b6f4388cce52eba}{index}}
\item 
uint16\+\_\+t \mbox{\hyperlink{structtruephy__dsp_a69f5f8c81316ca0e0a78c5caa2e52ed9}{data}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{truephy_8c_source_l00103}{103}} of file \mbox{\hyperlink{truephy_8c_source}{truephy.\+c}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structtruephy__dsp_a69f5f8c81316ca0e0a78c5caa2e52ed9}\label{structtruephy__dsp_a69f5f8c81316ca0e0a78c5caa2e52ed9}} 
\index{truephy\_dsp@{truephy\_dsp}!data@{data}}
\index{data@{data}!truephy\_dsp@{truephy\_dsp}}
\doxysubsubsection{\texorpdfstring{data}{data}}
{\footnotesize\ttfamily uint16\+\_\+t truephy\+\_\+dsp\+::data}



Definition at line \mbox{\hyperlink{truephy_8c_source_l00105}{105}} of file \mbox{\hyperlink{truephy_8c_source}{truephy.\+c}}.



Referenced by \mbox{\hyperlink{truephy_8c_source_l00220}{truephy\+\_\+reset()}}.

\mbox{\Hypertarget{structtruephy__dsp_aeb7e391432e3e1640b6f4388cce52eba}\label{structtruephy__dsp_aeb7e391432e3e1640b6f4388cce52eba}} 
\index{truephy\_dsp@{truephy\_dsp}!index@{index}}
\index{index@{index}!truephy\_dsp@{truephy\_dsp}}
\doxysubsubsection{\texorpdfstring{index}{index}}
{\footnotesize\ttfamily uint16\+\_\+t truephy\+\_\+dsp\+::index}



Definition at line \mbox{\hyperlink{truephy_8c_source_l00104}{104}} of file \mbox{\hyperlink{truephy_8c_source}{truephy.\+c}}.



Referenced by \mbox{\hyperlink{truephy_8c_source_l00220}{truephy\+\_\+reset()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/mii/\mbox{\hyperlink{truephy_8c}{truephy.\+c}}\end{DoxyCompactItemize}
