\hypertarget{structlio__callout}{}\doxysection{lio\+\_\+callout Struct Reference}
\label{structlio__callout}\index{lio\_callout@{lio\_callout}}


{\ttfamily \#include $<$lio\+\_\+device.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
struct callout \mbox{\hyperlink{structlio__callout_af644c35302e054c86914dc14b0944e37}{timer}}
\item 
void $\ast$ \mbox{\hyperlink{structlio__callout_a676a86b6589efe52e8c829d625a9bb94}{ctxptr}}
\item 
uint64\+\_\+t \mbox{\hyperlink{structlio__callout_a448d5b78fdfaed4d87ac51ef90c34e0d}{ctxul}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{lio__device_8h_source_l00280}{280}} of file \mbox{\hyperlink{lio__device_8h_source}{lio\+\_\+device.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structlio__callout_a676a86b6589efe52e8c829d625a9bb94}\label{structlio__callout_a676a86b6589efe52e8c829d625a9bb94}} 
\index{lio\_callout@{lio\_callout}!ctxptr@{ctxptr}}
\index{ctxptr@{ctxptr}!lio\_callout@{lio\_callout}}
\doxysubsubsection{\texorpdfstring{ctxptr}{ctxptr}}
{\footnotesize\ttfamily void$\ast$ lio\+\_\+callout\+::ctxptr}



Definition at line \mbox{\hyperlink{lio__device_8h_source_l00282}{282}} of file \mbox{\hyperlink{lio__device_8h_source}{lio\+\_\+device.\+h}}.



Referenced by \mbox{\hyperlink{lio__console_8c_source_l00621}{lio\+\_\+add\+\_\+console()}}, and \mbox{\hyperlink{lio__console_8c_source_l00515}{lio\+\_\+check\+\_\+console()}}.

\mbox{\Hypertarget{structlio__callout_a448d5b78fdfaed4d87ac51ef90c34e0d}\label{structlio__callout_a448d5b78fdfaed4d87ac51ef90c34e0d}} 
\index{lio\_callout@{lio\_callout}!ctxul@{ctxul}}
\index{ctxul@{ctxul}!lio\_callout@{lio\_callout}}
\doxysubsubsection{\texorpdfstring{ctxul}{ctxul}}
{\footnotesize\ttfamily uint64\+\_\+t lio\+\_\+callout\+::ctxul}



Definition at line \mbox{\hyperlink{lio__device_8h_source_l00283}{283}} of file \mbox{\hyperlink{lio__device_8h_source}{lio\+\_\+device.\+h}}.



Referenced by \mbox{\hyperlink{lio__console_8c_source_l00621}{lio\+\_\+add\+\_\+console()}}, and \mbox{\hyperlink{lio__console_8c_source_l00515}{lio\+\_\+check\+\_\+console()}}.

\mbox{\Hypertarget{structlio__callout_af644c35302e054c86914dc14b0944e37}\label{structlio__callout_af644c35302e054c86914dc14b0944e37}} 
\index{lio\_callout@{lio\_callout}!timer@{timer}}
\index{timer@{timer}!lio\_callout@{lio\_callout}}
\doxysubsubsection{\texorpdfstring{timer}{timer}}
{\footnotesize\ttfamily struct callout lio\+\_\+callout\+::timer}



Definition at line \mbox{\hyperlink{lio__device_8h_source_l00281}{281}} of file \mbox{\hyperlink{lio__device_8h_source}{lio\+\_\+device.\+h}}.



Referenced by \mbox{\hyperlink{lio__console_8c_source_l00621}{lio\+\_\+add\+\_\+console()}}, \mbox{\hyperlink{lio__console_8c_source_l00515}{lio\+\_\+check\+\_\+console()}}, and \mbox{\hyperlink{lio__console_8c_source_l00682}{lio\+\_\+remove\+\_\+consoles()}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/liquidio/base/\mbox{\hyperlink{lio__device_8h}{lio\+\_\+device.\+h}}\end{DoxyCompactItemize}
