\hypertarget{structi40e__aqc__thermal__sensor}{}\doxysection{i40e\+\_\+aqc\+\_\+thermal\+\_\+sensor Struct Reference}
\label{structi40e__aqc__thermal__sensor}\index{i40e\_aqc\_thermal\_sensor@{i40e\_aqc\_thermal\_sensor}}


{\ttfamily \#include $<$i40e\+\_\+adminq\+\_\+cmd.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{i40e__osdep_8h_a92c50087ca0e64fa93fc59402c55f8ca}{u8}} \mbox{\hyperlink{structi40e__aqc__thermal__sensor_ab2f2e31bf64e580aa9c3390cd51f73d1}{sensor\+\_\+action}}
\item 
\mbox{\hyperlink{i40e__osdep_8h_a92c50087ca0e64fa93fc59402c55f8ca}{u8}} \mbox{\hyperlink{structi40e__aqc__thermal__sensor_a3df1f687c598f82af8a380093d738eee}{reserved}} \mbox{[}7\mbox{]}
\item 
\mbox{\hyperlink{i40e__osdep_8h_a4eb26b9fcde1be4ec7556787e0d3281b}{\+\_\+\+\_\+le32}} \mbox{\hyperlink{structi40e__aqc__thermal__sensor_a71da9c6962b8fd9b95d42b13cb8e82f6}{addr\+\_\+high}}
\item 
\mbox{\hyperlink{i40e__osdep_8h_a4eb26b9fcde1be4ec7556787e0d3281b}{\+\_\+\+\_\+le32}} \mbox{\hyperlink{structi40e__aqc__thermal__sensor_a97f8d47a145e8a099572bfb0f7c1464b}{addr\+\_\+low}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{i40e__adminq__cmd_8h_source_l02502}{2502}} of file \mbox{\hyperlink{i40e__adminq__cmd_8h_source}{i40e\+\_\+adminq\+\_\+cmd.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structi40e__aqc__thermal__sensor_a71da9c6962b8fd9b95d42b13cb8e82f6}\label{structi40e__aqc__thermal__sensor_a71da9c6962b8fd9b95d42b13cb8e82f6}} 
\index{i40e\_aqc\_thermal\_sensor@{i40e\_aqc\_thermal\_sensor}!addr\_high@{addr\_high}}
\index{addr\_high@{addr\_high}!i40e\_aqc\_thermal\_sensor@{i40e\_aqc\_thermal\_sensor}}
\doxysubsubsection{\texorpdfstring{addr\_high}{addr\_high}}
{\footnotesize\ttfamily \mbox{\hyperlink{i40e__osdep_8h_a4eb26b9fcde1be4ec7556787e0d3281b}{\+\_\+\+\_\+le32}} i40e\+\_\+aqc\+\_\+thermal\+\_\+sensor\+::addr\+\_\+high}



Definition at line \mbox{\hyperlink{i40e__adminq__cmd_8h_source_l02508}{2508}} of file \mbox{\hyperlink{i40e__adminq__cmd_8h_source}{i40e\+\_\+adminq\+\_\+cmd.\+h}}.

\mbox{\Hypertarget{structi40e__aqc__thermal__sensor_a97f8d47a145e8a099572bfb0f7c1464b}\label{structi40e__aqc__thermal__sensor_a97f8d47a145e8a099572bfb0f7c1464b}} 
\index{i40e\_aqc\_thermal\_sensor@{i40e\_aqc\_thermal\_sensor}!addr\_low@{addr\_low}}
\index{addr\_low@{addr\_low}!i40e\_aqc\_thermal\_sensor@{i40e\_aqc\_thermal\_sensor}}
\doxysubsubsection{\texorpdfstring{addr\_low}{addr\_low}}
{\footnotesize\ttfamily \mbox{\hyperlink{i40e__osdep_8h_a4eb26b9fcde1be4ec7556787e0d3281b}{\+\_\+\+\_\+le32}} i40e\+\_\+aqc\+\_\+thermal\+\_\+sensor\+::addr\+\_\+low}



Definition at line \mbox{\hyperlink{i40e__adminq__cmd_8h_source_l02509}{2509}} of file \mbox{\hyperlink{i40e__adminq__cmd_8h_source}{i40e\+\_\+adminq\+\_\+cmd.\+h}}.

\mbox{\Hypertarget{structi40e__aqc__thermal__sensor_a3df1f687c598f82af8a380093d738eee}\label{structi40e__aqc__thermal__sensor_a3df1f687c598f82af8a380093d738eee}} 
\index{i40e\_aqc\_thermal\_sensor@{i40e\_aqc\_thermal\_sensor}!reserved@{reserved}}
\index{reserved@{reserved}!i40e\_aqc\_thermal\_sensor@{i40e\_aqc\_thermal\_sensor}}
\doxysubsubsection{\texorpdfstring{reserved}{reserved}}
{\footnotesize\ttfamily \mbox{\hyperlink{i40e__osdep_8h_a92c50087ca0e64fa93fc59402c55f8ca}{u8}} i40e\+\_\+aqc\+\_\+thermal\+\_\+sensor\+::reserved\mbox{[}7\mbox{]}}



Definition at line \mbox{\hyperlink{i40e__adminq__cmd_8h_source_l02507}{2507}} of file \mbox{\hyperlink{i40e__adminq__cmd_8h_source}{i40e\+\_\+adminq\+\_\+cmd.\+h}}.

\mbox{\Hypertarget{structi40e__aqc__thermal__sensor_ab2f2e31bf64e580aa9c3390cd51f73d1}\label{structi40e__aqc__thermal__sensor_ab2f2e31bf64e580aa9c3390cd51f73d1}} 
\index{i40e\_aqc\_thermal\_sensor@{i40e\_aqc\_thermal\_sensor}!sensor\_action@{sensor\_action}}
\index{sensor\_action@{sensor\_action}!i40e\_aqc\_thermal\_sensor@{i40e\_aqc\_thermal\_sensor}}
\doxysubsubsection{\texorpdfstring{sensor\_action}{sensor\_action}}
{\footnotesize\ttfamily \mbox{\hyperlink{i40e__osdep_8h_a92c50087ca0e64fa93fc59402c55f8ca}{u8}} i40e\+\_\+aqc\+\_\+thermal\+\_\+sensor\+::sensor\+\_\+action}



Definition at line \mbox{\hyperlink{i40e__adminq__cmd_8h_source_l02503}{2503}} of file \mbox{\hyperlink{i40e__adminq__cmd_8h_source}{i40e\+\_\+adminq\+\_\+cmd.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/ixl/\mbox{\hyperlink{i40e__adminq__cmd_8h}{i40e\+\_\+adminq\+\_\+cmd.\+h}}\end{DoxyCompactItemize}
