\hypertarget{structiwm__dts__measurement__notif__v2}{}\doxysection{iwm\+\_\+dts\+\_\+measurement\+\_\+notif\+\_\+v2 Struct Reference}
\label{structiwm__dts__measurement__notif__v2}\index{iwm\_dts\_measurement\_notif\_v2@{iwm\_dts\_measurement\_notif\_v2}}


{\ttfamily \#include $<$if\+\_\+iwmreg.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
int32\+\_\+t \mbox{\hyperlink{structiwm__dts__measurement__notif__v2_a5ca4f47723fc280e3ab18acffc41613f}{temp}}
\item 
int32\+\_\+t \mbox{\hyperlink{structiwm__dts__measurement__notif__v2_a0e7e9fa8d1d8d7b0652604ae04789bca}{voltage}}
\item 
int32\+\_\+t \mbox{\hyperlink{structiwm__dts__measurement__notif__v2_a5c9f07a71b148f217565e4df9ec283ce}{threshold\+\_\+idx}}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
struct \mbox{\hyperlink{structiwm__dts__measurement__notif__v2}{iwm\+\_\+dts\+\_\+measurement\+\_\+notif\+\_\+v2}} -\/ measurements notification

@temp\+: the measured temperature @voltage\+: the measured voltage @threshold\+\_\+idx\+: the trip index that was crossed 

Definition at line \mbox{\hyperlink{if__iwmreg_8h_source_l06804}{6804}} of file \mbox{\hyperlink{if__iwmreg_8h_source}{if\+\_\+iwmreg.\+h}}.



\doxysubsection{Field Documentation}
\mbox{\Hypertarget{structiwm__dts__measurement__notif__v2_a5ca4f47723fc280e3ab18acffc41613f}\label{structiwm__dts__measurement__notif__v2_a5ca4f47723fc280e3ab18acffc41613f}} 
\index{iwm\_dts\_measurement\_notif\_v2@{iwm\_dts\_measurement\_notif\_v2}!temp@{temp}}
\index{temp@{temp}!iwm\_dts\_measurement\_notif\_v2@{iwm\_dts\_measurement\_notif\_v2}}
\doxysubsubsection{\texorpdfstring{temp}{temp}}
{\footnotesize\ttfamily int32\+\_\+t iwm\+\_\+dts\+\_\+measurement\+\_\+notif\+\_\+v2\+::temp}



Definition at line \mbox{\hyperlink{if__iwmreg_8h_source_l06805}{6805}} of file \mbox{\hyperlink{if__iwmreg_8h_source}{if\+\_\+iwmreg.\+h}}.

\mbox{\Hypertarget{structiwm__dts__measurement__notif__v2_a5c9f07a71b148f217565e4df9ec283ce}\label{structiwm__dts__measurement__notif__v2_a5c9f07a71b148f217565e4df9ec283ce}} 
\index{iwm\_dts\_measurement\_notif\_v2@{iwm\_dts\_measurement\_notif\_v2}!threshold\_idx@{threshold\_idx}}
\index{threshold\_idx@{threshold\_idx}!iwm\_dts\_measurement\_notif\_v2@{iwm\_dts\_measurement\_notif\_v2}}
\doxysubsubsection{\texorpdfstring{threshold\_idx}{threshold\_idx}}
{\footnotesize\ttfamily int32\+\_\+t iwm\+\_\+dts\+\_\+measurement\+\_\+notif\+\_\+v2\+::threshold\+\_\+idx}



Definition at line \mbox{\hyperlink{if__iwmreg_8h_source_l06807}{6807}} of file \mbox{\hyperlink{if__iwmreg_8h_source}{if\+\_\+iwmreg.\+h}}.

\mbox{\Hypertarget{structiwm__dts__measurement__notif__v2_a0e7e9fa8d1d8d7b0652604ae04789bca}\label{structiwm__dts__measurement__notif__v2_a0e7e9fa8d1d8d7b0652604ae04789bca}} 
\index{iwm\_dts\_measurement\_notif\_v2@{iwm\_dts\_measurement\_notif\_v2}!voltage@{voltage}}
\index{voltage@{voltage}!iwm\_dts\_measurement\_notif\_v2@{iwm\_dts\_measurement\_notif\_v2}}
\doxysubsubsection{\texorpdfstring{voltage}{voltage}}
{\footnotesize\ttfamily int32\+\_\+t iwm\+\_\+dts\+\_\+measurement\+\_\+notif\+\_\+v2\+::voltage}



Definition at line \mbox{\hyperlink{if__iwmreg_8h_source_l06806}{6806}} of file \mbox{\hyperlink{if__iwmreg_8h_source}{if\+\_\+iwmreg.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dev/iwm/\mbox{\hyperlink{if__iwmreg_8h}{if\+\_\+iwmreg.\+h}}\end{DoxyCompactItemize}
