\hypertarget{ar9130__phy_8c}{}\doxysection{dev/ath/ath\+\_\+hal/ar9001/ar9130\+\_\+phy.c File Reference}
\label{ar9130__phy_8c}\index{dev/ath/ath\_hal/ar9001/ar9130\_phy.c@{dev/ath/ath\_hal/ar9001/ar9130\_phy.c}}
{\ttfamily \#include \char`\"{}opt\+\_\+ah.\+h\char`\"{}}\newline
{\ttfamily \#include \char`\"{}ah.\+h\char`\"{}}\newline
{\ttfamily \#include \char`\"{}ah\+\_\+internal.\+h\char`\"{}}\newline
{\ttfamily \#include \char`\"{}ah\+\_\+devid.\+h\char`\"{}}\newline
{\ttfamily \#include \char`\"{}ar5416/ar5416.\+h\char`\"{}}\newline
{\ttfamily \#include \char`\"{}ar5416/ar5416reg.\+h\char`\"{}}\newline
{\ttfamily \#include \char`\"{}ar5416/ar5416phy.\+h\char`\"{}}\newline
{\ttfamily \#include \char`\"{}ar9001/ar9130\+\_\+phy.\+h\char`\"{}}\newline
Include dependency graph for ar9130\+\_\+phy.\+c\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{dc/df3/ar9130__phy_8c__incl}
\end{center}
\end{figure}
\doxysubsection*{Functions}
\begin{DoxyCompactItemize}
\item 
void \mbox{\hyperlink{ar9130__phy_8c_ab1061154c20f088d2092398511dc3e34}{ar9130\+Init\+PLL}} (struct \mbox{\hyperlink{structath__hal}{ath\+\_\+hal}} $\ast$ah, const struct ieee80211\+\_\+channel $\ast$chan)
\end{DoxyCompactItemize}


\doxysubsection{Function Documentation}
\mbox{\Hypertarget{ar9130__phy_8c_ab1061154c20f088d2092398511dc3e34}\label{ar9130__phy_8c_ab1061154c20f088d2092398511dc3e34}} 
\index{ar9130\_phy.c@{ar9130\_phy.c}!ar9130InitPLL@{ar9130InitPLL}}
\index{ar9130InitPLL@{ar9130InitPLL}!ar9130\_phy.c@{ar9130\_phy.c}}
\doxysubsubsection{\texorpdfstring{ar9130InitPLL()}{ar9130InitPLL()}}
{\footnotesize\ttfamily void ar9130\+Init\+PLL (\begin{DoxyParamCaption}\item[{struct \mbox{\hyperlink{structath__hal}{ath\+\_\+hal}} $\ast$}]{ah,  }\item[{const struct ieee80211\+\_\+channel $\ast$}]{chan }\end{DoxyParamCaption})}



Definition at line \mbox{\hyperlink{ar9130__phy_8c_source_l00033}{33}} of file \mbox{\hyperlink{ar9130__phy_8c_source}{ar9130\+\_\+phy.\+c}}.



References \mbox{\hyperlink{ar5416reg_8h_source_l00112}{AR\+\_\+\+RTC\+\_\+\+PLL\+\_\+\+CONTROL}}, \mbox{\hyperlink{ar5416reg_8h_source_l00115}{AR\+\_\+\+RTC\+\_\+\+SLEEP\+\_\+\+CLK}}, \mbox{\hyperlink{ar5416reg_8h_source_l00425}{AR\+\_\+\+RTC\+\_\+\+SLEEP\+\_\+\+DERIVED\+\_\+\+CLK}}, \mbox{\hyperlink{ah__osdep_8h_source_l00069}{OS\+\_\+\+DELAY}}, \mbox{\hyperlink{ah__osdep_8h_source_l00139}{OS\+\_\+\+REG\+\_\+\+WRITE}}, and \mbox{\hyperlink{ar5416__reset_8c_source_l00042}{RTC\+\_\+\+PLL\+\_\+\+SETTLE\+\_\+\+DELAY}}.



Referenced by \mbox{\hyperlink{ar9130__attach_8c_source_l00073}{ar9130\+Attach()}}.

Here is the caller graph for this function\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=281pt]{dd/d8e/ar9130__phy_8c_ab1061154c20f088d2092398511dc3e34_icgraph}
\end{center}
\end{figure}
